Cirrus Master Installer Online Help

To install display driver and software, click on the available buttons on the “Welcome” dialog or reference to the topics listed below.

Display Driver

DirectX

Manual


Install Windows 95/98 Display driver
Install Windows 95/98 Display driver:

1). Start Windows 95/98 with standard VGA driver.

2). Insert Setup for PCI-53/Video-60 CD into your CD_ROM drive.

3). Click on Display Driver button to install Win95/98 Display Driver

4). Follow the on-screen instructions to finish the driver installation.

More detailed information could be found in the README file or User’s Manual.


Install DirectX API
Install DirectX API for Windows 95/98:

1). Click on DirectX button.

2). Follow the on-screen instructions to finish the installation.

More detailed information could be found in the README file or User’s Manual.


Install MPEG Player
Install MPEG Player for Windows 95/98:

1). Click on MPEG Player button.

2). Follow the on-screen instructions to finish the installation.

More detailed information could be found in the README file or User’s Manual.


Setup Video-60P Display Driver

1). Click on Settings tab.

2). Select Change Display Type at selection bar.

3). Click the Change button next to Adapter Type.

4). Click Have Disk at Select Device Page.

5). Under the statement “Copy Manufacturer’s file from”, enter X:\Video60\WIN95-98, where X is drive letter of your CD_ROM drive.

6). Click OK to start installing the driver files from your CD_ROM drive.

7). Select “Cirrus Logic 5446 PCI (vx.xx) for VIDEO-60P” under the list of Models in the Select Device Page. Click OK and close the Select Device Page.

8). Click Close to close the Change Display Type.

9). Select the Color Palette, and Desktop Area of your choice.

Once the desired Color palette and Desktop area have been chosen, close the Display Properties and the Windows 95/98 will prompt you to reboot.

More detailed information could be found in the README file or User’s Manual.


Install TriSpectives software for Windows 95/98

1). Click on TriSpectives button.

2). Follow the on-screen instructions to finish the installation.

More detailed information could be found in the README file or User’s Manual.


Manual

User’s Manual can also be found in the directory  “DOCUMENT” under the board name subdirectory.


NOTE

1).During installation,  it will prompt you for  Serial Number, please type “TS20110A-B1-03445”;

2).When you  launch TriSpectives at the first time,  it will prompt you for  CD Key,  please type “ 2006 0364 7931 9952”.


Setup Video-97 Display accelerated driver

1). Click on Settings tab.

2). Select Change Display Type at selection bar.

3). Click the Change button next to Adapter Type.

4). Click Have Disk at Select Device Page.

5). Under the statement “Copy Manufacturer’s file from”, enter X:\V97\WIN_95, where X is drive letter of your CD_ROM drive.

6). Click OK to start installing the driver files from your CD_ROM drive.

7). Select “Video-97 3DImage 985  (AGP vXXXX)” under the list of Models in the Select Device Page. Click OK and close the Select Device Page.

8). Click Close to close the Change Display Type.

9). Select the Color Palette, and Desktop Area of your choice.

Once the desired Color palette and Desktop area have been chosen, close the Display Properties and the Windows 95 will prompt you to reboot.

More detailed information could be found in the README file or User’s Manual.


Setup Video-97 Display accelerated driver (VIA Motherboard only)

1). Click on Settings tab.

2). Select Change Display Type at selection bar.

3). Click the Change button next to Adapter Type.

4). Click Have Disk at Select Device Page.

5). Under the statement “Copy Manufacturer’s file from”, enter X:\V97\WIN_95\VIA, where X is drive letter of your CD_ROM drive.

6). Click OK to start installing the driver files from your CD_ROM drive.

7). Select “Video-97 3DImage 985  (AGP vXXXX)” under the list of Models in the Select Device Page. Click OK and close the Select Device Page.

8). Click Close to close the Change Display Type.

9). Select the Color Palette, and Desktop Area of your choice.

Once the desired Color palette and Desktop area have been chosen, close the Display Properties and the Windows 95 will prompt you to reboot.

More detailed information could be found in the README file or User’s Manual.


Setup Video-70P Display Driver
Setup Video-53 Display Driver

1). Click on Settings tab.

2). Select Change Display Type at selection bar.

3). Click the Change button next to Adapter Type.

4). Click Have Disk at Select Device Page.

5). Under the statement “Copy Manufacturer’s file from”, enter X:\Video53\WIN95-98, where X is drive letter of your CD_ROM drive.

6). Click OK to start installing the driver files from your CD_ROM drive.

7). Select “Cirrus Logic 546X PCI (vX.XX) for VIDEO-70P” under the list of Models in the Select Device Page. Click OK and close the Select Device Page.

8). Click Close to close the Change Display Type.

9). Select the Color Palette, and Desktop Area of your choice.

Once the desired Color palette and Desktop area have been chosen, close the Display Properties and the Windows 95/98 will prompt you to reboot.

More detailed information could be found in the README file or User’s Manual.


Setup Video-57 Display accelerated driver

1). Click on Settings tab.

2). Select Change Display Type at selection bar.

3). Click the Change button next to Adapter Type.

4). Click Have Disk at Select Device Page.

5). Under the statement “Copy Manufacturer’s file from”, enter X:\V57\WIN_95, where X is drive letter of your CD_ROM drive.

6). Click OK to start installing the driver files from your CD_ROM drive.

7). Select “VIDEO-57P Linear Accelerated for PCI (vx.xx.xx)” under the list of Models in the Select Device Page. Click OK and close the Select Device Page.

8). Click Close to close the Change Display Type.

9). Select the Color Palette, and Desktop Area of your choice.

Once the desired Color palette and Desktop area have been chosen, close the Display Properties and the Windows 95 will prompt you to reboot.

More detailed information could be found in the README file or User’s Manual.